{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"USERNAME","type":"character","width":16},{"name":"USERDESC","type":"character","width":50},{"name":"PASSWORD","type":"character","width":8},{"name":"GROUPNAME","type":"character","width":8},{"name":"ISGROUP","type":"logical","width":1},{"name":"AUTSTR","type":"character","width":48},{"name":"AUTSTR1","type":"character","width":48},{"name":"AUTSTR2","type":"character","width":48},{"name":"AUTSTR3","type":"character","width":48},{"name":"CONNECTED","type":"logical","width":1},{"name":"PERMISSION","type":"memo","width":10,"read":false},{"name":"DATAPWD","type":"date","width":8}],"n_rows":1,"rows_kept":1,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"foxpro_two","encoding_class":"enc_absent","reader":"statdb_count/12"}
["ADMIN","Amministratore","²·s°¸´",null,false,null,null,null,null,false,null,null]